Wlabel = "Calculator Help"
Contents = Overview,
	   Memory,
	   Errors,
	   Options,
	   Decimal Display
Name = Overview
Llabel = " USE OF CALCULTR"
Slabel = "  USE   "
Branch = Memory, Errors, Options, Decimal Display
Title = "How to use the Calculator"
Text = 
The Four-Function Calculator is used like an ordinary calculator. \
A number may be entered into the calculator by pointing to the \
number keys of the calculator with the mouse and pressing the left-hand \
button on the mouse or by pressing the appropriate number key on the \
keyboard.  To complete the entry of a number, point to an operator key \
(+,-,*,/), the "=" key or a memory key (M+, M-) and press the mouse \
button.  To change the sign of a number that has been entered, point \
to the "+/-" key and press the mouse button.
\EOT\

Name = Memory
Llabel = "CALCULTR MEMORY"
Slabel = " MEMORY "
Branch = Overview, Errors, Options, Decimal Display
Title = "Calculator Memory"
Text =
The calculator has a "memory" so that intermediate results can be saved. \
Special calculator keys allow the calculator value to be added to or \
subtracted from the value in memory.  The "MR" key is used to recall the \
value in memory.  These memory functions can be performed using the mouse \
or the labeled function keys.  An "M" is displayed to the right of the \
calculator value whenever a value is in memory.

The value in memory can be displayed in a special window.  See the Options \
screen for more information on displaying the memory register.
\EOT\

Name = Errors
Llabel = "CLEARING ERRORS"
Slabel = " ERRORS "
Branch = Overview, Memory, Options, Decimal Display
Title = "Clearing Errors"
Text =
If a number is entered incorrectly, clear the error by pressing the "Clear \
Entry" function key.  To clear the calculator to start a new calculation, \
press the "Clear All" function key.  The memory can be cleared with the \
"Clear Memory" function key.
\EOT\

Name = Options
Llabel = "OPTIONS "
Slabel = "OPTIONS "
Branch = Overview, Memory, Errors, Decimal Display
Title = "Calculator Options"
Text =
Options may be set to display the value in the memory register and to fix \
the number of decimal places displayed.  Press the OPTS key or the middle \
button of the mouse to display the Options window.  The Options window is \
also used to close the memory register window and to display additional \
information about the calculator program.
\EOT\

Name = Decimal Display
Llabel = "DECIMAL DISPLAY"
Slabel = "DECIMALS"
Branch = Overview, Memory, Errors
Title = "Decimal Display"
Text =
The number of decimal places to be displayed in the result may be selected. \
From the Options window, select the "Set Decimal Display" option. \
A new window will be displayed and the number of decimal places can be \
selected.  Numbers entered into the calculator and the results of \
calculations will be rounded to the desired precision.

If the number of decimal places chosen is "None", all results will be \
rounded to the nearest integer.  If the number of decimal places chosen \
is "Variable", as many decimal places as will fit in the calculator display \
will be used.
\EOT\

